Doc. no. J16/99-0020 WG21 N1197 Date: 15^{th} April 1999 Project: Programming Language C++ Reply to: martino@theheart.ie

Motions

Core Working Group

Motion #1

Move we submit to the Project Editor as Potential Defect Reports all those issues in 99-0019 == N1196, "Core WG Defect Resolutions".

Library Working Group

Motion #2

Move we submit to the Project Editor as Potential Defect Reports all those issues with a status of "Ready" in 99-0007 == N1184, the Library Issues List (Revision 6).